EXPORTS
	?NewL@CLbsTestServer@@SAPAV1@XZ @ 1 NONAME ; class CLbsTestServer * CLbsTestServer::NewL(void)
	?StopLbsSystem@CLbsTestServer@@QAEHXZ @ 2 NONAME ; int CLbsTestServer::StopLbsSystem(void)
	?ResetLbsSystem@CLbsTestServer@@QAEHXZ @ 3 NONAME ; int CLbsTestServer::ResetLbsSystem(void)
	?StartLbsSystem@CLbsTestServer@@QAEHXZ @ 4 NONAME ; int CLbsTestServer::StartLbsSystem(void)

