EXPORTS
	_ZN18CRa8DecoderIntfcCI11FrameNumberEv @ 1 NONAME
	_ZN18CRa8DecoderIntfcCI13SetInitStringER6TDesC8 @ 2 NONAME
	_ZN18CRa8DecoderIntfcCI4NewLEv @ 3 NONAME
	_ZN18CRa8DecoderIntfcCID0Ev @ 4 NONAME
	_ZN18CRa8DecoderIntfcCID1Ev @ 5 NONAME
	_ZN18CRa8DecoderIntfcCID2Ev @ 6 NONAME
	_ZTI18CRa8DecoderIntfcCI @ 7 NONAME ; #<TI>#
	_ZTV18CRa8DecoderIntfcCI @ 8 NONAME ; #<VT>#

