EXPORTS
	_Z15NewSynchroniserv @ 1 NONAME
	_ZTI24CContactTestSynchroniser @ 2 NONAME ; #<TI>#
	_ZTV24CContactTestSynchroniser @ 3 NONAME ; #<VT>#

