
diff -r 2b7283837edb -r 3104fc151679 instantmessagesalert/tsrc/testinstantmsgalert/eabi/testinstantmsgalertu.def
--- a/instantmessagesalert/tsrc/testinstantmsgalert/eabi/testinstantmsgalertu.def	Thu Aug 19 09:41:53 2010 +0300
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,26 +0,0 @@
-EXPORTS
-	_Z9LibEntryLR13CTestModuleIf @ 1 NONAME
-	_ZN15CIMAlertManager12AddObserverLEPK23MIMAlertManagerObserver @ 2 NONAME
-	_ZN15CIMAlertManager14RemoveObserverEPK23MIMAlertManagerObserver @ 3 NONAME
-	_ZN15CIMAlertManager14SetRingingTypeE19TProfileRingingType @ 4 NONAME
-	_ZN15CIMAlertManager4NewLEv @ 5 NONAME
-	_ZN15CIMAlertManager4StopEv @ 6 NONAME
-	_ZN15CIMAlertManager5PlayLEm @ 7 NONAME
-	_ZN15CIMAlertManager7DoPlayLEm @ 8 NONAME
-	_ZN15CIMAlertManager8SetVibraEi @ 9 NONAME
-	_ZN15CIMAlertManager9SetVolumeEi @ 10 NONAME
-	_ZN20CVIMPSTSettingsStore4NewLEv @ 11 NONAME
-	_ZN20CVIMPSTSettingsStore5NewLCEv @ 12 NONAME
-	_ZN22IMAlertNotifierFactory15CreateNotifierLEP27MIMAlertNotifierKeyObserver @ 13 NONAME
-	_ZTI15CIMAlertManager @ 14 NONAME ; #<TI>#
-	_ZTI20CIMAlertNotifierImpl @ 15 NONAME ; #<TI>#
-	_ZTV15CIMAlertManager @ 16 NONAME ; #<VT>#
-	_ZTV20CIMAlertNotifierImpl @ 17 NONAME ; #<VT>#
-	_ZThn20_N15CIMAlertManager12AddObserverLEPK23MIMAlertManagerObserver @ 18 NONAME ; #<thunk>#
-	_ZThn20_N15CIMAlertManager14RemoveObserverEPK23MIMAlertManagerObserver @ 19 NONAME ; #<thunk>#
-	_ZThn20_N15CIMAlertManager14SetRingingTypeE19TProfileRingingType @ 20 NONAME ; #<thunk>#
-	_ZThn20_N15CIMAlertManager4StopEv @ 21 NONAME ; #<thunk>#
-	_ZThn20_N15CIMAlertManager5PlayLEm @ 22 NONAME ; #<thunk>#
-	_ZThn20_N15CIMAlertManager8SetVibraEi @ 23 NONAME ; #<thunk>#
-	_ZThn20_N15CIMAlertManager9SetVolumeEi @ 24 NONAME ; #<thunk>#
-




