
diff -r 7b872347d83b -r 6d0b9f605b61 convergedconnectionhandler/cchclientapi/cchuinotif/eabi/cchuinotifu.def
--- a/convergedconnectionhandler/cchclientapi/cchuinotif/eabi/cchuinotifu.def	Tue Feb 02 00:05:57 2010 +0200
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,3 +0,0 @@
-EXPORTS
-	_Z13NotifierArrayv @ 1 NONAME
-




