
diff -r f742655b05bf -r d38647835c2e convergedconnectionhandler/cchclientapi/cchuinotif/eabi/cchuinotifu.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/convergedconnectionhandler/cchclientapi/cchuinotif/eabi/cchuinotifu.def	Wed Sep 01 12:29:57 2010 +0100
@@ -0,0 +1,3 @@
+EXPORTS
+	_Z13NotifierArrayv @ 1 NONAME
+




