
diff -r 65a3ef1d5bd0 -r f742655b05bf convergedconnectionhandler/cchclientapi/cchuinotif/eabi/cchuinotifu.def
--- a/convergedconnectionhandler/cchclientapi/cchuinotif/eabi/cchuinotifu.def	Thu Aug 19 09:45:22 2010 +0300
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,3 +0,0 @@
-EXPORTS
-	_Z13NotifierArrayv @ 1 NONAME
-




