EXPORTS
	??1CClockTimeSourceInterface@@UAE@XZ @ 1 NONAME ; CClockTimeSourceInterface::~CClockTimeSourceInterface(void)
	?NewL@CClockTimeSourceInterface@@SAPAV1@ABVTUid@@PAVMClockPluginObserver@@@Z @ 2 NONAME ; class CClockTimeSourceInterface * CClockTimeSourceInterface::NewL(class TUid const &, class MClockPluginObserver *)

