
diff -r 92ab7f8d0eab -r 6bb1b21d2484 phoneapp/phoneuiqtviewadapter/eabi/phoneuiqtviewadapteru.def
--- a/phoneapp/phoneuiqtviewadapter/eabi/phoneuiqtviewadapteru.def	Fri Mar 19 09:28:42 2010 +0200
+++ b/phoneapp/phoneuiqtviewadapter/eabi/phoneuiqtviewadapteru.def	Fri Apr 16 14:58:25 2010 +0300
@@ -98,4 +98,7 @@
 	_ZThn8_N20PhoneUIQtViewAdapterD0Ev @ 97 NONAME
 	_ZThn8_N20PhoneUIQtViewAdapterD1Ev @ 98 NONAME
 	_ZNK20PhoneResourceAdapter18convertToHbActionsEi @ 99 NONAME
+	_ZN20PhoneUIQtViewAdapter15convertDurationEi @ 100 NONAME
+	_ZN20PhoneUIQtViewAdapter22setBubbleSelectionFlagEv @ 101 NONAME
+	_ZN20PhoneUIQtViewAdapter25handleCipheringInfoChangeEiP18TPhoneCommandParam @ 102 NONAME
 




