EXPORTS
	_Z9LibEntryLR13CTestModuleIf @ 1 NONAME
	_ZTI22CVcxMdsShutdownMonitor @ 2 NONAME
	_ZTV22CVcxMdsShutdownMonitor @ 3 NONAME

