
diff -r 6dc066157ed4 -r d9b6a8729acd vtprotocolplugins/DisplaySink/bmarm/VTIMAGECONVERTERU.DEF
--- a/vtprotocolplugins/DisplaySink/bmarm/VTIMAGECONVERTERU.DEF	Tue Jan 26 12:01:21 2010 +0200
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,18 +0,0 @@
-EXPORTS
-	"_._25CVSFbsBitmapIYUVConverter" @ 1 NONAME R3UNUSED ; CVSFbsBitmapIYUVConverter::~CVSFbsBitmapIYUVConverter(void)
-	NewL__25CVTIYUVFbsBitmapConverterRC5TSizeRC10CFbsBitmap @ 2 NONAME R3UNUSED ; CVTIYUVFbsBitmapConverter::NewL(TSize const &, CFbsBitmap const &)
-	NewL__25CVTIYUVFbsBitmapConverterRC5TSizei @ 3 NONAME R3UNUSED ; CVTIYUVFbsBitmapConverter::NewL(TSize const &, int)
-	NewL__25CVTYV12FbsBitmapConverterRC5TSizeRC10CFbsBitmap @ 4 NONAME R3UNUSED ; CVTYV12FbsBitmapConverter::NewL(TSize const &, CFbsBitmap const &)
-	NewL__25CVTYV12FbsBitmapConverterRC5TSizei @ 5 NONAME R3UNUSED ; CVTYV12FbsBitmapConverter::NewL(TSize const &, int)
-	ProcessL__24CVTYUVFbsBitmapConverter @ 6 NONAME R3UNUSED ; CVTYUVFbsBitmapConverter::ProcessL(void)
-	ProcessL__25CVSFbsBitmapIYUVConverter @ 7 NONAME R3UNUSED ; CVSFbsBitmapIYUVConverter::ProcessL(void)
-	SetDestinationL__24CVTYUVFbsBitmapConverterRC10CFbsBitmap @ 8 NONAME R3UNUSED ; CVTYUVFbsBitmapConverter::SetDestinationL(CFbsBitmap const &)
-	SetDestinationL__24CVTYUVFbsBitmapConverteri @ 9 NONAME R3UNUSED ; CVTYUVFbsBitmapConverter::SetDestinationL(int)
-	SetSourceL__25CVSFbsBitmapIYUVConverterRC10CFbsBitmap @ 10 NONAME R3UNUSED ; CVSFbsBitmapIYUVConverter::SetSourceL(CFbsBitmap const &)
-	SetSourceL__30CVTYUVPlanarFbsBitmapConverterRC5TSizeRC6TDesC8 @ 11 NONAME R3UNUSED ; CVTYUVPlanarFbsBitmapConverter::SetSourceL(TSize const &, TDesC8 const &)
-	SetSourceL__30CVTYUVPlanarFbsBitmapConverterRC6TDesC8 @ 12 NONAME R3UNUSED ; CVTYUVPlanarFbsBitmapConverter::SetSourceL(TDesC8 const &)
-	SetSourceSizeL__30CVTYUVPlanarFbsBitmapConverterRC5TSize @ 13 NONAME R3UNUSED ; CVTYUVPlanarFbsBitmapConverter::SetSourceSizeL(TSize const &)
-	YUVData__C25CVSFbsBitmapIYUVConverter @ 14 NONAME R3UNUSED ; CVSFbsBitmapIYUVConverter::YUVData(void) const
-	"_._24CVTYUVFbsBitmapConverter" @ 15 NONAME R3UNUSED ; CVTYUVFbsBitmapConverter::~CVTYUVFbsBitmapConverter(void)
-	NewL__25CVSFbsBitmapIYUVConverterRC10CFbsBitmap @ 16 NONAME R3UNUSED ; CVSFbsBitmapIYUVConverter::NewL(CFbsBitmap const &)
-




