
diff -r 6dc066157ed4 -r d9b6a8729acd vtprotocolplugins/DisplaySink/bmarm/VTIMAGETRANSFORMSU.DEF
--- a/vtprotocolplugins/DisplaySink/bmarm/VTIMAGETRANSFORMSU.DEF	Tue Jan 26 12:01:21 2010 +0200
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,28 +0,0 @@
-EXPORTS
-	"_._15CVtImageRotator" @ 1 NONAME R3UNUSED ; CVtImageRotator::~CVtImageRotator(void)
-	Image__C12CVtImageIYUV @ 2 NONAME R3UNUSED ; CVtImageIYUV::Image(void) const
-	NewL__12CVtImageIYUVRC5TSize @ 3 NONAME R3UNUSED ; CVtImageIYUV::NewL(TSize const &)
-	NewL__12CVtImageIYUVRC5TSizeR5TPtr8 @ 4 NONAME R3UNUSED ; CVtImageIYUV::NewL(TSize const &, TPtr8 &)
-	NewL__12CVtImageIYUVRC5TSizeRC6TDesC8 @ 5 NONAME R3UNUSED ; CVtImageIYUV::NewL(TSize const &, TDesC8 const &)
-	NewL__14CVtImageBitmapRC5TSize12TDisplayMode @ 6 NONAME R3UNUSED ; CVtImageBitmap::NewL(TSize const &, TDisplayMode)
-	NewL__14CVtImageBitmapi @ 7 NONAME R3UNUSED ; CVtImageBitmap::NewL(int)
-	NewL__14CVtImageScalerR22MVtImageScalerObserverQ214CVtImageScaler8TQualityQ27CActive9TPriority @ 8 NONAME R3UNUSED ; CVtImageScaler::NewL(MVtImageScalerObserver &, CVtImageScaler::TQuality, CActive::TPriority)
-	NewL__15CVtImageRotatorR23MVtImageRotatorObserverQ27CActive9TPriority @ 9 NONAME R3UNUSED ; CVtImageRotator::NewL(MVtImageRotatorObserver &, CActive::TPriority)
-	ResizeL__14CVtImageBitmapRC5TSize @ 10 NONAME R3UNUSED ; CVtImageBitmap::ResizeL(TSize const &)
-	RotateL__15CVtImageRotatorRC8CVtImageR8CVtImageRCQ215CVtImageRotator14TRotationAngle @ 11 NONAME ; CVtImageRotator::RotateL(CVtImage const &, CVtImage &, CVtImageRotator::TRotationAngle const &)
-	ScaleL__14CVtImageScalerRC8CVtImageR8CVtImage @ 12 NONAME R3UNUSED ; CVtImageScaler::ScaleL(CVtImage const &, CVtImage &)
-	SetBitmapL__14CVtImageBitmapi @ 13 NONAME R3UNUSED ; CVtImageBitmap::SetBitmapL(int)
-	SetImageL__12CVtImageIYUVR5TPtr8 @ 14 NONAME R3UNUSED ; CVtImageIYUV::SetImageL(TPtr8 &)
-	SetImageL__12CVtImageIYUVRC6TDesC8 @ 15 NONAME R3UNUSED ; CVtImageIYUV::SetImageL(TDesC8 const &)
-	SetQualityL__14CVtImageScalerQ214CVtImageScaler8TQuality @ 16 NONAME R3UNUSED ; CVtImageScaler::SetQualityL(CVtImageScaler::TQuality)
-	Type__C8CVtImage @ 17 NONAME R3UNUSED ; CVtImage::Type(void) const
-	UVPlaneHeight__C12CVtImageIYUV @ 18 NONAME R3UNUSED ; CVtImageIYUV::UVPlaneHeight(void) const
-	UVPlaneWidth__C12CVtImageIYUV @ 19 NONAME R3UNUSED ; CVtImageIYUV::UVPlaneWidth(void) const
-	U__C12CVtImageIYUV @ 20 NONAME R3UNUSED ; CVtImageIYUV::U(void) const
-	V__C12CVtImageIYUV @ 21 NONAME R3UNUSED ; CVtImageIYUV::V(void) const
-	Y__C12CVtImageIYUV @ 22 NONAME R3UNUSED ; CVtImageIYUV::Y(void) const
-	"_._12CVtImageIYUV" @ 23 NONAME R3UNUSED ; CVtImageIYUV::~CVtImageIYUV(void)
-	"_._14CVtImageBitmap" @ 24 NONAME R3UNUSED ; CVtImageBitmap::~CVtImageBitmap(void)
-	"_._14CVtImageScaler" @ 25 NONAME R3UNUSED ; CVtImageScaler::~CVtImageScaler(void)
-	Bitmap__C14CVtImageBitmap @ 26 NONAME R3UNUSED ; CVtImageBitmap::Bitmap(void) const
-




