
diff -r 000000000000 -r 63b37f68c1ce adaptationlayer/bcaiscadapter/bcatoisc_dll/bwins/bcatoiscu.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/adaptationlayer/bcaiscadapter/bcatoisc_dll/bwins/bcatoiscu.def	Fri Nov 06 17:28:23 2009 +0000
@@ -0,0 +1,3 @@
+EXPORTS
+	NewBcaToIscFactoryL @ 1 NONAME
+




