
diff -r 510c70acdbf6 -r 8ccc39f9d787 connectivitylayer/isce/isaaccessextension_dll/eabi/isakernelapiu.def
--- a/connectivitylayer/isce/isaaccessextension_dll/eabi/isakernelapiu.def	Mon Nov 09 10:36:19 2009 +0000
+++ b/connectivitylayer/isce/isaaccessextension_dll/eabi/isakernelapiu.def	Thu Jan 14 10:44:58 2010 +0200
@@ -63,4 +63,5 @@
 	_ZN9DReqQueueD1Ev @ 62 NONAME
 	_ZN9DReqQueueD2Ev @ 63 NONAME
 	_ZNK13DIsaKernelAPI23NotifyStateChangeCancelEv @ 64 NONAME
+	_ZN18MISIObjectRouterIf7ConnectElRhP18MISIRouterObjectIf @ 65 NONAME
 




