EXPORTS
	_Z9LibEntryLv @ 1 NONAME
	_Z15SetRequirementsRP16CTestModuleParamRm @ 2 NONAME
	_Z19SetMemoryMonitorTlsP14CMemoryMonitor @ 3 NONAME
	_Z23CreateOOMWatcherThreadLv @ 4 NONAME
	_ZN17COomMonitorPlugin10ConstructLEv @ 5 NONAME
	_ZN17COomMonitorPlugin18ExtensionInterfaceE4TUidRPv @ 6 NONAME
	_ZN17COomMonitorPlugin9FsSessionEv @ 7 NONAME
	_ZN17COomMonitorPlugin9WsSessionEv @ 8 NONAME
	_ZN17COomMonitorPluginC2Ev @ 9 NONAME
	_ZN17COomMonitorPluginD0Ev @ 10 NONAME
	_ZN17COomMonitorPluginD1Ev @ 11 NONAME
	_ZN17COomMonitorPluginD2Ev @ 12 NONAME
	_ZN18ROomMonitorSession14SetOomPriorityENS_12TOomPriorityE @ 13 NONAME
	_ZN18ROomMonitorSession17RequestFreeMemoryEi @ 14 NONAME
	_ZN18ROomMonitorSession17RequestFreeMemoryEiR14TRequestStatus @ 15 NONAME
	_ZN18ROomMonitorSession18RequestOptionalRamEiiiR14TRequestStatus @ 16 NONAME
	_ZN18ROomMonitorSession18RequestOptionalRamEiiiRi @ 17 NONAME
	_ZN18ROomMonitorSession19ThisAppIsNotExitingEi @ 18 NONAME
	_ZN18ROomMonitorSession23CancelRequestFreeMemoryEv @ 19 NONAME
	_ZN18ROomMonitorSession7ConnectEv @ 20 NONAME
	_ZN19COomMonitorPluginV27FreeRamEv @ 21 NONAME
	_ZN20CAppOomMonitorPlugin4NewLE4TUid @ 22 NONAME
	_ZTI15COomFriendClass @ 23 NONAME
	_ZTI16CUt_OomTestTimer @ 24 NONAME
	_ZTI17COomMonitorPlugin @ 25 NONAME
	_ZTI19COomMonitorPluginV2 @ 26 NONAME
	_ZTV15COomFriendClass @ 27 NONAME
	_ZTV16CUt_OomTestTimer @ 28 NONAME
	_ZTV17COomMonitorPlugin @ 29 NONAME
	_ZTV19COomMonitorPluginV2 @ 30 NONAME

