EXPORTS
	_Z9LibEntryLv @ 1 NONAME
	_Z15SetRequirementsRP16CTestModuleParamRm @ 2 NONAME
	_Z19SetMemoryMonitorTlsP14CMemoryMonitor @ 3 NONAME
	_ZN17COomMonitorPlugin10ConstructLEv @ 4 NONAME
	_ZN17COomMonitorPlugin18ExtensionInterfaceE4TUidRPv @ 5 NONAME
	_ZN17COomMonitorPlugin9FsSessionEv @ 6 NONAME
	_ZN17COomMonitorPlugin9WsSessionEv @ 7 NONAME
	_ZN17COomMonitorPluginC2Ev @ 8 NONAME
	_ZN17COomMonitorPluginD0Ev @ 9 NONAME
	_ZN17COomMonitorPluginD1Ev @ 10 NONAME
	_ZN17COomMonitorPluginD2Ev @ 11 NONAME
	_ZN19COomMonitorPluginV27FreeRamEv @ 12 NONAME
	_ZN20CAppOomMonitorPlugin4NewLE4TUid @ 13 NONAME
	_ZTI15COomFriendClass @ 14 NONAME
	_ZTI17COomMonitorPlugin @ 15 NONAME
	_ZTI19COomMonitorPluginV2 @ 16 NONAME
	_ZTI6DicLog @ 17 NONAME
	_ZTV15COomFriendClass @ 18 NONAME
	_ZTV17COomMonitorPlugin @ 19 NONAME
	_ZTV19COomMonitorPluginV2 @ 20 NONAME
	_ZTV6DicLog @ 21 NONAME

