EXPORTS
	_ZN14ASTstAlarmTest12WaitForEventEiR14TRequestStatusRi @ 1 NONAME
	_ZN14ASTstAlarmTest15TestClearStoreLEv @ 2 NONAME
	_ZN14ASTstAlarmTest15TestEventBufferEiR14TRequestStatusRi @ 3 NONAME
	_ZN14ASTstAlarmTest16TestStartServersEPv @ 4 NONAME
	_ZN14ASTstAlarmTest20CountOrphanedAlarmsLEv @ 5 NONAME
	_ZN14ASTstAlarmTest36WaitForNotificationBufferToBeEmptiedER14TRequestStatusRi @ 6 NONAME
	_ZN14ASTstAlarmTest4EndLEv @ 7 NONAME
	_ZN14ASTstAlarmTest4NextERK7TDesC16 @ 8 NONAME
	_ZN14ASTstAlarmTest4SelfEv @ 9 NONAME
	_ZN14ASTstAlarmTest5CloseEv @ 10 NONAME
	_ZN14ASTstAlarmTest5StartERK7TDesC16 @ 11 NONAME
	_ZN14ASTstAlarmTest5TitleEv @ 12 NONAME
	_ZN14ASTstAlarmTest7UpLevelEv @ 13 NONAME
	_ZN14ASTstAlarmTestC1Ev @ 14 NONAME
	_ZN14ASTstAlarmTestC2Ev @ 15 NONAME
	_ZN14ASTstAlarmTestclEi @ 16 NONAME
	_ZN14ASTstAlarmTestclEii @ 17 NONAME
	_ZN14ASTstAlarmTestclEiiPKt @ 18 NONAME

