
diff -r 34024902876b -r 50d5061ee01e camappengine/StillConverter/Bmarm/CAESTILLCONVERTERU.DEF
--- a/camappengine/StillConverter/Bmarm/CAESTILLCONVERTERU.DEF	Fri Mar 19 09:33:47 2010 +0200
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,14 +0,0 @@
-EXPORTS
-	"_._16CCaeStillEncoder" @ 1 NONAME R3UNUSED ; CCaeStillEncoder::~CCaeStillEncoder(void)
-	Cleanup__16CCaeStillEncoder @ 2 NONAME R3UNUSED ; CCaeStillEncoder::Cleanup(void)
-	CompressionQuality__C16CCaeStillEncoder @ 3 NONAME R3UNUSED ; CCaeStillEncoder::CompressionQuality(void) const
-	ConvertCFbsBitmapToHBufC8L__16CCaeStillEncoderP10CFbsBitmapQ216CCaeStillEncoder13TTargetFormat @ 4 NONAME R3UNUSED ; CCaeStillEncoder::ConvertCFbsBitmapToHBufC8L(CFbsBitmap *, CCaeStillEncoder::TTargetFormat)
-	ConvertHBufC8ToCFbsBitmapL__16CCaeStillDecoderP6HBufC812TDisplayModeRC5TSizeT3 @ 5 NONAME ; CCaeStillDecoder::ConvertHBufC8ToCFbsBitmapL(HBufC8 *, TDisplayMode, TSize const &, TSize const &)
-	NewL__16CCaeStillDecoder @ 6 NONAME R3UNUSED ; CCaeStillDecoder::NewL(void)
-	NewL__16CCaeStillEncoder @ 7 NONAME R3UNUSED ; CCaeStillEncoder::NewL(void)
-	SetCompressionQuality__16CCaeStillEncoderi @ 8 NONAME R3UNUSED ; CCaeStillEncoder::SetCompressionQuality(int)
-	SetObserver__16CCaeStillDecoderP24MCaeStillDecoderObserver @ 9 NONAME R3UNUSED ; CCaeStillDecoder::SetObserver(MCaeStillDecoderObserver *)
-	SetObserver__16CCaeStillEncoderP24MCaeStillEncoderObserver @ 10 NONAME R3UNUSED ; CCaeStillEncoder::SetObserver(MCaeStillEncoderObserver *)
-	"_._16CCaeStillDecoder" @ 11 NONAME R3UNUSED ; CCaeStillDecoder::~CCaeStillDecoder(void)
-	Cleanup__16CCaeStillDecoder @ 12 NONAME R3UNUSED ; CCaeStillDecoder::Cleanup(void)
-




