
diff -r 6369bfd1b60d -r 08b5eae9f9ff upnpframework/upnputilities/EABI/upnpconnmonu.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/upnpframework/upnputilities/EABI/upnpconnmonu.def	Wed Nov 03 11:45:09 2010 +0200
@@ -0,0 +1,8 @@
+EXPORTS
+	_ZN22CUPnPConnectionMonitor11SetObserverER30MUPnPConnectionMonitorObserver @ 1 NONAME
+	_ZN22CUPnPConnectionMonitor15NotifyIapCancelEv @ 2 NONAME
+	_ZN22CUPnPConnectionMonitor4NewLEi @ 3 NONAME
+	_ZN22CUPnPConnectionMonitor9NotifyIapEi @ 4 NONAME
+	_ZTI22CUPnPConnectionMonitor @ 5 NONAME
+	_ZTV22CUPnPConnectionMonitor @ 6 NONAME
+




