EXPORTS
	_ZN22CUPnPConnectionMonitor11SetObserverER30MUPnPConnectionMonitorObserver @ 1 NONAME
	_ZN22CUPnPConnectionMonitor15NotifyIapCancelEv @ 2 NONAME
	_ZN22CUPnPConnectionMonitor4NewLEi @ 3 NONAME
	_ZN22CUPnPConnectionMonitor9NotifyIapEi @ 4 NONAME
	_ZTI22CUPnPConnectionMonitor @ 5 NONAME
	_ZTV22CUPnPConnectionMonitor @ 6 NONAME

