
diff -r 71e347f905f2 -r 4a7fac7dd34a gst_plugins_base/eabi/libgstaudioresampleu.def
--- a/gst_plugins_base/eabi/libgstaudioresampleu.def	Fri Mar 19 09:35:09 2010 +0200
+++ b/gst_plugins_base/eabi/libgstaudioresampleu.def	Fri Apr 16 15:15:52 2010 +0300
@@ -1,52 +1,4 @@
 EXPORTS
 	_GST_PLUGIN_DESC @ 1 NONAME
-	audioresample_buffer_new @ 2 NONAME
-	audioresample_buffer_new_and_alloc @ 3 NONAME
-	audioresample_buffer_new_subbuffer @ 4 NONAME
-	audioresample_buffer_new_with_data @ 5 NONAME
-	audioresample_buffer_queue_flush @ 6 NONAME
-	audioresample_buffer_queue_free @ 7 NONAME
-	audioresample_buffer_queue_get_depth @ 8 NONAME
-	audioresample_buffer_queue_get_offset @ 9 NONAME
-	audioresample_buffer_queue_new @ 10 NONAME
-	audioresample_buffer_queue_peek @ 11 NONAME
-	audioresample_buffer_queue_pull @ 12 NONAME
-	audioresample_buffer_queue_push @ 13 NONAME
-	audioresample_buffer_ref @ 14 NONAME
-	audioresample_buffer_unref @ 15 NONAME
-	functable_calculate @ 16 NONAME
-	functable_calculate_multiply @ 17 NONAME
-	functable_evaluate @ 18 NONAME
-	functable_fir @ 19 NONAME
-	functable_fir2 @ 20 NONAME
-	functable_free @ 21 NONAME
-	functable_func_boxcar @ 22 NONAME
-	functable_func_hanning @ 23 NONAME
-	functable_func_sinc @ 24 NONAME
-	functable_new @ 25 NONAME
-	functable_set_length @ 26 NONAME
-	functable_set_multiplier @ 27 NONAME
-	functable_set_offset @ 28 NONAME
-	gst_audioresample_get_type @ 29 NONAME
-	resample_add_input_data @ 30 NONAME
-	resample_format_size @ 31 NONAME
-	resample_free @ 32 NONAME
-	resample_get_input_size_for_output @ 33 NONAME
-	resample_get_output_data @ 34 NONAME
-	resample_get_output_size @ 35 NONAME
-	resample_get_output_size_for_input @ 36 NONAME
-	resample_init @ 37 NONAME
-	resample_input_eos @ 38 NONAME
-	resample_input_flush @ 39 NONAME
-	resample_input_pushthrough @ 40 NONAME
-	resample_new @ 41 NONAME
-	resample_scale_chunk @ 42 NONAME
-	resample_scale_functable @ 43 NONAME
-	resample_scale_ref @ 44 NONAME
-	resample_set_filter_length @ 45 NONAME
-	resample_set_format @ 46 NONAME
-	resample_set_input_rate @ 47 NONAME
-	resample_set_method @ 48 NONAME
-	resample_set_n_channels @ 49 NONAME
-	resample_set_output_rate @ 50 NONAME
+	gst_audio_resample_get_type @ 2 NONAME
 




