
diff -r fae53e47b8b4 -r 7ce29e50e9e1 gst_plugins_good/eabi/libgstcamerabinu.def
--- a/gst_plugins_good/eabi/libgstcamerabinu.def	Fri Jun 11 16:24:58 2010 +0100
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,5 +0,0 @@
-EXPORTS
-	gst_camerabin_get_type @ 1 NONAME
-	gst_camerabin_image_get_type @ 2 NONAME
-	gst_camerabin_video_get_type @ 3 NONAME
-




