
diff -r 4b0c6ed43234 -r 8e837d1bf446 gst_plugins_base/bwins/liboilu.def
--- a/gst_plugins_base/bwins/liboilu.def	Wed Mar 24 17:58:42 2010 -0500
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,15 +0,0 @@
-EXPORTS
-	merge_linear_argb_ref @ 1 NONAME
-	oil_class_optimize @ 2 NONAME
-	oil_cpu_get_flags @ 3 NONAME
-	oil_impl_is_runnable @ 4 NONAME
-	oil_merge_linear_argb @ 5 NONAME
-	oil_merge_linear_u8 @ 6 NONAME
-	oil_resample_linear_argb @ 7 NONAME
-	oil_resample_linear_u8 @ 8 NONAME
-	oil_scalarmultiply_f32_ns @ 9 NONAME
-	oil_splat_u8 @ 10 NONAME
-	oil_splat_u8_ns @ 11 NONAME
-	resample_linear_argb_ref @ 12 NONAME
-	resample_linear_u8_ref @ 13 NONAME
-




