
diff -r f1bdd6b078d1 -r 2cb9bae34d17 fep/aknfep/UiPlugins/AknFepUiInterface/bwins/aknfepuiinterfaceu.def
--- a/fep/aknfep/UiPlugins/AknFepUiInterface/bwins/aknfepuiinterfaceu.def	Tue Jul 06 14:38:41 2010 +0300
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,8 +0,0 @@
-EXPORTS
-	??1CAknFepUIInterface@@UAE@XZ @ 1 NONAME ; CAknFepUIInterface::~CAknFepUIInterface(void)
-	?DynInitMenuBarL@MAknFepUiInterfaceMenuObserver@@UAEXHPAVCAknFepUiInterfaceMenuBar@@@Z @ 2 NONAME ; void MAknFepUiInterfaceMenuObserver::DynInitMenuBarL(int, class CAknFepUiInterfaceMenuBar *)
-	?DynInitMenuPaneL@MAknFepUiInterfaceMenuObserver@@UAEXHPAVCAknFepUiInterfaceMenuPane@@@Z @ 3 NONAME ; void MAknFepUiInterfaceMenuObserver::DynInitMenuPaneL(int, class CAknFepUiInterfaceMenuPane *)
-	?NewL@CAknFepUIInterface@@SAPAV1@XZ @ 4 NONAME ; class CAknFepUIInterface * CAknFepUIInterface::NewL(void)
-	??1CAknFepIndicator@@UAE@XZ @ 5 NONAME ; CAknFepIndicator::~CAknFepIndicator(void)
-	?SetCopyMode@CAknFepIndicator@@QAEXH@Z @ 6 NONAME ; void CAknFepIndicator::SetCopyMode(int)
-




