
diff -r 000000000000 -r 5a93021fdf25 connectionutilities/ConnectionDialogs/cconndlg/EABI/CCONNDLGPLUGINU.DEF
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/connectionutilities/ConnectionDialogs/cconndlg/EABI/CCONNDLGPLUGINU.DEF	Thu Dec 17 08:55:21 2009 +0200
@@ -0,0 +1,3 @@
+EXPORTS
+	_Z13NotifierArrayv @ 1 NONAME
+




