EXPORTS
	_Z6E32Dll10TDllReason @ 1 NONAME
	_ZN24CConnectionMonitorPlugin15RegisterPluginLEj @ 2 NONAME
	_ZN24CConnectionMonitorPlugin20CancelRegisterPluginEv @ 3 NONAME
	_ZN24CConnectionMonitorPluginC2Ev @ 4 NONAME
	_ZN24CConnectionMonitorPluginD0Ev @ 5 NONAME
	_ZN24CConnectionMonitorPluginD1Ev @ 6 NONAME
	_ZN24CConnectionMonitorPluginD2Ev @ 7 NONAME
	_ZNK24CConnectionMonitorPlugin17RegisterAttributeEj @ 8 NONAME
	_ZNK24CConnectionMonitorPlugin23CancelRegisterAttributeEj @ 9 NONAME
	_ZNK24CConnectionMonitorPlugin5EventEjPKvj @ 10 NONAME
	_ZNK24CConnectionMonitorPlugin7VersionEv @ 11 NONAME
	_ZTI24CConnectionMonitorPlugin @ 12 NONAME ; #<TI>#
	_ZTV24CConnectionMonitorPlugin @ 13 NONAME ; #<VT>#
	_ZThn4_N24CConnectionMonitorPluginD0Ev @ 14 NONAME ; #<thunk>#
	_ZThn4_N24CConnectionMonitorPluginD1Ev @ 15 NONAME ; #<thunk>#
	_ZTI9CPluginAO @ 16 NONAME ; #<TI>#
	_ZTV9CPluginAO @ 17 NONAME ; #<VT>#

