EXPORTS
	_ZN20CLbtMovementDetector4NewLEv @ 1 NONAME
	_ZN20CLbtMovementDetectorD0Ev @ 2 NONAME
	_ZN20CLbtMovementDetectorD1Ev @ 3 NONAME
	_ZN20CLbtMovementDetectorD2Ev @ 4 NONAME
	_ZTI20CLbtMovementDetector @ 5 NONAME ; #<TI>#
	_ZTV20CLbtMovementDetector @ 6 NONAME ; #<VT>#

