EXPORTS
	_ZN27CPosReverseGeocodeInterface4NewLER26MPosReverseGeocodeObserver @ 1 NONAME
	_ZN27CPosReverseGeocodeInterfaceD0Ev @ 2 NONAME
	_ZN27CPosReverseGeocodeInterfaceD1Ev @ 3 NONAME
	_ZN27CPosReverseGeocodeInterfaceD2Ev @ 4 NONAME
	_ZTI27CPosReverseGeocodeInterface @ 5 NONAME
	_ZTV27CPosReverseGeocodeInterface @ 6 NONAME

