
diff -r 33ae025ac1e8 -r 2290317b9ec5 mds_plat/harvester_framework_api/tsrc/HarvesterDataTest/eabi/HarvesterDataTestu.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/mds_plat/harvester_framework_api/tsrc/HarvesterDataTest/eabi/HarvesterDataTestu.def	Fri May 14 16:38:28 2010 +0300
@@ -0,0 +1,3 @@
+EXPORTS
+	_Z9LibEntryLR13CTestModuleIf @ 1 NONAME
+




