
diff -r 2af57effcf41 -r 0713fb089b10 applayerprotocols/httptransportfw/Test/EABI/httptestutilsU.def
--- a/applayerprotocols/httptransportfw/Test/EABI/httptestutilsU.def	Thu Jun 17 12:05:02 2010 +0100
+++ b/applayerprotocols/httptransportfw/Test/EABI/httptestutilsU.def	Thu Jul 22 16:38:27 2010 +0100
@@ -126,5 +126,4 @@
 	_ZN14CHTTPTestUtils23CleanupFailedTestsArrayEv @ 125 NONAME
 	_ZN14CHTTPTestUtils23CreateFailedTestsArrayLEv @ 126 NONAME
 	_ZN11CScriptFile7SectionERK7TDesC16 @ 127 NONAME
-	_ZZN14CHTTPTestUtils8OverflowER6TDes16E15KErrOverflowMsg @ 128 NONAME DATA 12
-
+	
\ No newline at end of file




