
diff -r 35488577e233 -r 2fa1fa551b0b cbs/CbsServer/Bwins/CBSSERVERU.DEF
--- a/cbs/CbsServer/Bwins/CBSSERVERU.DEF	Mon Aug 23 15:50:31 2010 +0300
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,6 +0,0 @@
-EXPORTS
-	?WinsMain@@YAHPAX@Z @ 1 NONAME ; int __cdecl WinsMain(void *)
-	?__DbgTestInvariant@CCbsDbImpSettings@@QBEXXZ @ 2 NONAME ; public: void __thiscall CCbsDbImpSettings::__DbgTestInvariant(void)const 
-	?__DbgTestInvariant@CCbsDbImpTopicList@@QBEXXZ @ 3 NONAME ; public: void __thiscall CCbsDbImpTopicList::__DbgTestInvariant(void)const 
-	?__DbgTestInvariant@CCbsRecEtel@@QBEXXZ @ 4 NONAME ; public: void __thiscall CCbsRecEtel::__DbgTestInvariant(void)const 
-




