
diff -r c32dc0be5eb4 -r 6b4fc789785b remotestoragefw/remotefileengine/eabi/rsfwcontrolu.def
--- a/remotestoragefw/remotefileengine/eabi/rsfwcontrolu.def	Mon Jan 18 21:00:57 2010 +0200
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,16 +0,0 @@
-EXPORTS
-	_ZN12RRsfwControl12GetMountInfoERK5TCharR14TRsfwMountInfo @ 1 NONAME
-	_ZN12RRsfwControl16RefreshDirectoryERK7TDesC16 @ 2 NONAME
-	_ZN12RRsfwControl18DismountByVolumeIdEi @ 3 NONAME
-	_ZN12RRsfwControl20CancelRemoteTransferERK7TDesC16 @ 4 NONAME
-	_ZN12RRsfwControl21DismountByDriveLetterE5TChar @ 5 NONAME
-	_ZN12RRsfwControl23SetMountConnectionStateERK5TCharj @ 6 NONAME
-	_ZN12RRsfwControl5MountERK16TRsfwMountConfigR14TRequestStatus @ 7 NONAME
-	_ZN12RRsfwControl5MountEi @ 8 NONAME
-	_ZN12RRsfwControl7ConnectEv @ 9 NONAME
-	_ZN12RRsfwControl7VersionEv @ 10 NONAME
-	_ZN12RRsfwControlC1Ev @ 11 NONAME
-	_ZN12RRsfwControlC2Ev @ 12 NONAME
-	_ZN12RRsfwControl10MountBlindEi @ 13 NONAME
-	_ZN12RRsfwControl5MountERK16TRsfwMountConfig @ 14 NONAME
-




