
diff -r 3dcb815346df -r 4096754ee773 localconnectivityservice/obexsendservices/obexservicesendutils/bmarm/BTSERVICEUTILSU.DEF
--- a/localconnectivityservice/obexsendservices/obexservicesendutils/bmarm/BTSERVICEUTILSU.DEF	Thu Aug 19 10:46:39 2010 +0300
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,10 +0,0 @@
-EXPORTS
-	StartSynchronousServiceL__13CBTServiceAPI14TBTServiceTypeP23CBTServiceParameterList @ 1 NONAME R3UNUSED ; CBTServiceAPI::StartSynchronousServiceL(TBTServiceType, CBTServiceParameterList *)
-	AddObjectL__23CBTServiceParameterListRC7TDesC16 @ 2 NONAME R3UNUSED ; CBTServiceParameterList::AddObjectL(TDesC16 const &)
-	AddXhtmlL__23CBTServiceParameterListRC7TDesC16 @ 3 NONAME R3UNUSED ; CBTServiceParameterList::AddXhtmlL(TDesC16 const &)
-	NewLC__23CBTServiceParameterList @ 4 NONAME R3UNUSED ; CBTServiceParameterList::NewLC(void)
-	NewL__13CBTServiceAPI @ 5 NONAME R3UNUSED ; CBTServiceAPI::NewL(void)
-	NewL__23CBTServiceParameterList @ 6 NONAME R3UNUSED ; CBTServiceParameterList::NewL(void)
-	StartServiceL__13CBTServiceAPI14TBTServiceTypeP23CBTServiceParameterList @ 7 NONAME R3UNUSED ; CBTServiceAPI::StartServiceL(TBTServiceType, CBTServiceParameterList *)
-	AddImageL__23CBTServiceParameterListRC7TDesC16 @ 8 NONAME R3UNUSED ; CBTServiceParameterList::AddImageL(TDesC16 const &)
-




