
diff -r 3dcb815346df -r 4096754ee773 localconnectivityservice/obexsendservices/obexservicesendutils/eabi/BtServiceUtilsU.DEF
--- a/localconnectivityservice/obexsendservices/obexservicesendutils/eabi/BtServiceUtilsU.DEF	Thu Aug 19 10:46:39 2010 +0300
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,16 +0,0 @@
-EXPORTS
-	_ZN13CBTServiceAPI13StartServiceLE14TBTServiceTypeP23CBTServiceParameterList @ 1 NONAME
-	_ZN13CBTServiceAPI24StartSynchronousServiceLE14TBTServiceTypeP23CBTServiceParameterList @ 2 NONAME
-	_ZN13CBTServiceAPI4NewLEv @ 3 NONAME
-	_ZN23CBTServiceParameterList10AddObjectLE5RFile @ 4 NONAME
-	_ZN23CBTServiceParameterList10AddObjectLERK7TDesC16 @ 5 NONAME
-	_ZN23CBTServiceParameterList4NewLEv @ 6 NONAME
-	_ZN23CBTServiceParameterList5NewLCEv @ 7 NONAME
-	_ZN23CBTServiceParameterList9AddImageLE5RFile @ 8 NONAME
-	_ZN23CBTServiceParameterList9AddImageLERK7TDesC16 @ 9 NONAME
-	_ZN23CBTServiceParameterList9AddXhtmlLERK7TDesC16 @ 10 NONAME
-	_ZTI13CBTServiceAPI @ 11 NONAME ; #<TI>#
-	_ZTI23CBTServiceParameterList @ 12 NONAME ; #<TI>#
-	_ZTV13CBTServiceAPI @ 13 NONAME ; #<VT>#
-	_ZTV23CBTServiceParameterList @ 14 NONAME ; #<VT>#
-




