EXPORTS
	_Z20SetGMemoryMonitorTlsP14CMemoryMonitor @ 1 NONAME
	_Z24CreateGOOMWatcherThreadLv @ 2 NONAME
	_ZN19RGOomMonitorSession15SetGOomPriorityENS_13TGOomPriorityE @ 3 NONAME
	_ZN19RGOomMonitorSession17RequestFreeMemoryEi @ 4 NONAME
	_ZN19RGOomMonitorSession17RequestFreeMemoryEiR14TRequestStatus @ 5 NONAME
	_ZN19RGOomMonitorSession18RequestOptionalRamEiiiR14TRequestStatus @ 6 NONAME
	_ZN19RGOomMonitorSession18RequestOptionalRamEiiiRi @ 7 NONAME
	_ZN19RGOomMonitorSession19ThisAppIsNotExitingEi @ 8 NONAME
	_ZN19RGOomMonitorSession23CancelRequestFreeMemoryEv @ 9 NONAME
	_ZN19RGOomMonitorSession7ConnectEv @ 10 NONAME
	_ZN21CAppGOomMonitorPlugin4NewLE4TUid @ 11 NONAME
	_ZN22CGOomMonitorPluginBase10ConstructLEv @ 12 NONAME
	_ZN22CGOomMonitorPluginBase18ExtensionInterfaceE4TUidRPv @ 13 NONAME
	_ZN22CGOomMonitorPluginBase9FsSessionEv @ 14 NONAME
	_ZN22CGOomMonitorPluginBase9WsSessionEv @ 15 NONAME
	_ZN22CGOomMonitorPluginBaseC2Ev @ 16 NONAME
	_ZN22CGOomMonitorPluginBaseD0Ev @ 17 NONAME
	_ZN22CGOomMonitorPluginBaseD1Ev @ 18 NONAME
	_ZN22CGOomMonitorPluginBaseD2Ev @ 19 NONAME
	_ZTI22CGOomMonitorPluginBase @ 20 NONAME
	_ZTV22CGOomMonitorPluginBase @ 21 NONAME
	_ZN19RGOomMonitorSession23ApplicationAboutToStartERK4TUid @ 22 NONAME
	_ZN19RGOomMonitorSession11IsConnectedEv @ 23 NONAME
	_ZN19RGOomMonitorSession22UsesAbsoluteMemTargetsEi @ 24 NONAME
	_ZN19RGOomMonitorSession15AppAboutToStartER14TRequestStatusRK4TUid @ 25 NONAME
	_ZN19RGOomMonitorSession7ConnectER14TRequestStatus @ 26 NONAME

