
diff -r ae43a6765dd5 -r 2c61986c60fa videoconnutility/connutility/eabi/vcxconnectionutilityu.def
--- a/videoconnutility/connutility/eabi/vcxconnectionutilityu.def	Fri Apr 16 16:02:30 2010 +0300
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,17 +0,0 @@
-EXPORTS
-	_ZN21CVcxConnectionUtility11DisconnectLEv @ 1 NONAME
-	_ZN21CVcxConnectionUtility14RemoveObserverEP23MConnUtilEngineObserver @ 2 NONAME
-	_ZN21CVcxConnectionUtility17RegisterObserverLEP23MConnUtilEngineObserver @ 3 NONAME
-	_ZN21CVcxConnectionUtility22DecreaseReferenceCountEv @ 4 NONAME
-	_ZN21CVcxConnectionUtility6GetIapERmi @ 5 NONAME
-	_ZN21CVcxConnectionUtility9InstanceLEv @ 6 NONAME
-	_ZTIN4Meta11TMetaVarLenI5RBuf8EE @ 7 NONAME ; #<TI>#
-	_ZTIN4Meta11TMetaVarLenI6RBuf16EE @ 8 NONAME ; #<TI>#
-	_ZTIN4Meta12TMetaVarLen8I5RBuf8EE @ 9 NONAME ; #<TI>#
-	_ZTIN4Meta13TMetaVarLen16I6RBuf16EE @ 10 NONAME ; #<TI>#
-	_ZTVN4Meta11TMetaVarLenI5RBuf8EE @ 11 NONAME ; #<VT>#
-	_ZTVN4Meta11TMetaVarLenI6RBuf16EE @ 12 NONAME ; #<VT>#
-	_ZTVN4Meta12TMetaVarLen8I5RBuf8EE @ 13 NONAME ; #<VT>#
-	_ZTVN4Meta13TMetaVarLen16I6RBuf16EE @ 14 NONAME ; #<VT>#
-	_ZN21CVcxConnectionUtility15WapIdFromIapIdLEm @ 15 NONAME
-




