
diff -r 000000000000 -r 4e1aa6a622a0 resourcemgmt/hwresourcesmgr/vibra/bwins/HWRMVibraClientU.DEF
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/resourcemgmt/hwresourcesmgr/vibra/bwins/HWRMVibraClientU.DEF	Tue Feb 02 00:53:00 2010 +0200
@@ -0,0 +1,6 @@
+EXPORTS
+	?NewL@CHWRMVibra@@SAPAV1@PAVMHWRMVibraObserver@@@Z @ 1 NONAME ; class CHWRMVibra * CHWRMVibra::NewL(class MHWRMVibraObserver *)
+	?NewL@CHWRMVibra@@SAPAV1@XZ @ 2 NONAME ; class CHWRMVibra * CHWRMVibra::NewL(void)
+	?NewLC@CHWRMVibra@@SAPAV1@PAVMHWRMVibraObserver@@@Z @ 3 NONAME ; class CHWRMVibra * CHWRMVibra::NewLC(class MHWRMVibraObserver *)
+	?NewLC@CHWRMVibra@@SAPAV1@XZ @ 4 NONAME ; class CHWRMVibra * CHWRMVibra::NewLC(void)
+




