EXPORTS
	_ZN10CHWRMPower14GetBatteryInfoER14TRequestStatusRNS_23TBatteryConsumptionDataE @ 1 NONAME
	_ZN10CHWRMPower20GetBaseTimeIntervalLERi @ 2 NONAME
	_ZN10CHWRMPower21GetBatteryVoltageInfoER14TRequestStatusRNS_19TBatteryVoltageDataE @ 3 NONAME
	_ZN10CHWRMPower28StartAverageVoltageReportingER14TRequestStatusRKNS_17TIntervalMultipleE @ 4 NONAME ABSENT
	_ZN10CHWRMPower28StopAverageVoltageReportingLEv @ 5 NONAME ABSENT
	_ZN10CHWRMPower32StartAverageConsumptionReportingER14TRequestStatusRKNS_17TIntervalMultipleE @ 6 NONAME ABSENT
	_ZN10CHWRMPower32StopAverageConsumptionReportingLEv @ 7 NONAME ABSENT
	_ZN10CHWRMPower4NewLEP27MHWRMBatteryVoltageObserverP31MHWRMBatteryConsumptionObserver @ 8 NONAME ABSENT
	_ZN10CHWRMPower5NewLCEP27MHWRMBatteryVoltageObserverP31MHWRMBatteryConsumptionObserver @ 9 NONAME ABSENT
	_ZN10CHWRMPowerD0Ev @ 10 NONAME
	_ZN10CHWRMPowerD1Ev @ 11 NONAME
	_ZN10CHWRMPowerD2Ev @ 12 NONAME
	_ZTI26CHWRMBatteryMeasurementsAO @ 13 NONAME
	_ZTV26CHWRMBatteryMeasurementsAO @ 14 NONAME
	_ZN10CHWRMPower22SetPowerReportObserverEP25MHWRMBatteryPowerObserver @ 15 NONAME
	_ZN10CHWRMPower26StartAveragePowerReportingER14TRequestStatusRKj @ 16 NONAME
	_ZN10CHWRMPower26StopAveragePowerReportingLEv @ 17 NONAME
	_ZN10CHWRMPower4NewLEv @ 18 NONAME
	_ZN10CHWRMPower5NewLCEv @ 19 NONAME

