EXPORTS
	Install__17RLoggingAllocator @ 1 NONAME R3UNUSED ; RLoggingAllocator::Install(void)
	Uninstall__17RLoggingAllocator @ 2 NONAME R3UNUSED ; RLoggingAllocator::Uninstall(void)
	Install__17RLoggingAllocatorUi @ 3 NONAME R3UNUSED ; RLoggingAllocator::Install(unsigned int)
	New__17RLoggingAllocatorUiP10RAllocatorRP17RLoggingAllocator @ 4 NONAME R3UNUSED ; RLoggingAllocator::New(unsigned int, RAllocator *, RLoggingAllocator *&)
	StaticTraceAlloc__17RLoggingAllocatorP10RAllocatorPvi @ 5 NONAME R3UNUSED ; RLoggingAllocator::StaticTraceAlloc(RAllocator *, void *, int)
	StaticTraceFree__17RLoggingAllocatorP10RAllocatorPv @ 6 NONAME R3UNUSED ; RLoggingAllocator::StaticTraceFree(RAllocator *, void *)

