EXPORTS
	_ZN16RBtSerialSession11CancelWriteEv @ 1 NONAME
	_ZN16RBtSerialSession17WaitForConnectionER14TRequestStatus @ 2 NONAME
	_ZN16RBtSerialSession23CancelWaitForConnectionEv @ 3 NONAME
	_ZN16RBtSerialSession5CloseEv @ 4 NONAME
	_ZN16RBtSerialSession5WriteERK6TDesC8R14TRequestStatus @ 5 NONAME
	_ZN16RBtSerialSession7ConnectEv @ 6 NONAME
	_ZN34CBluetoothIncomingSerialConnection10CancelReadEv @ 7 NONAME
	_ZN34CBluetoothIncomingSerialConnection11CancelWriteEv @ 8 NONAME
	_ZN34CBluetoothIncomingSerialConnection17WaitForConnectionEv @ 9 NONAME
	_ZN34CBluetoothIncomingSerialConnection4NewLER29MBtIncomingConnectionObserver @ 10 NONAME
	_ZN34CBluetoothIncomingSerialConnection4ReadER5TDes8 @ 11 NONAME
	_ZN34CBluetoothIncomingSerialConnection5WriteERK6TDesC8 @ 12 NONAME
	_ZN34CBluetoothIncomingSerialConnection8ShutDownEv @ 13 NONAME
	_ZN34CBluetoothIncomingSerialConnection9ConnectedEv @ 14 NONAME
	_ZN34CBluetoothIncomingSerialConnectionD0Ev @ 15 NONAME
	_ZN34CBluetoothIncomingSerialConnectionD1Ev @ 16 NONAME
	_ZN34CBluetoothIncomingSerialConnectionD2Ev @ 17 NONAME
	_ZNK16RBtSerialSession10CancelReadEv @ 18 NONAME
	_ZNK16RBtSerialSession11IsConnectedEv @ 19 NONAME
	_ZNK16RBtSerialSession4ReadER5TDes8R14TRequestStatus @ 20 NONAME
	_ZTI15CBtSerialServer @ 21 NONAME ; #<TI>#
	_ZTI16CBtSerialSession @ 22 NONAME ; #<TI>#
	_ZTI34CBluetoothIncomingSerialConnection @ 23 NONAME ; #<TI>#
	_ZTV15CBtSerialServer @ 24 NONAME ; #<VT>#
	_ZTV16CBtSerialSession @ 25 NONAME ; #<VT>#
	_ZTV34CBluetoothIncomingSerialConnection @ 26 NONAME ; #<VT>#
	_ZN16RBtSerialSession22GetConnectedDeviceAddrER10TBTDevAddr @ 27 NONAME
	_ZN16RBtSerialSession22GetConnectedDeviceNameER6TDes16 @ 28 NONAME
	_ZN34CBluetoothIncomingSerialConnection20ConnectedDeviceAddrLEv @ 29 NONAME
	_ZN34CBluetoothIncomingSerialConnection23GetConnectedDeviceNameLEv @ 30 NONAME

