EXPORTS
	__10RProxyHeapR13RMemoryAccessUi @ 1 NONAME R3UNUSED ; RProxyHeap::RProxyHeap(RMemoryAccess &, unsigned int)
	AddCaptureL__12CKeyCapturerP17MCaptureInterfaceiiii @ 2 NONAME ; CKeyCapturer::AddCaptureL(MCaptureInterface *, int, int, int, int)
	AddLongCaptureL__12CKeyCapturerP17MCaptureInterfaceiii @ 3 NONAME ; CKeyCapturer::AddLongCaptureL(MCaptureInterface *, int, int, int)
	AddLongCaptureL__12CKeyCapturerP17MCaptureInterfaceiiii @ 4 NONAME ; CKeyCapturer::AddLongCaptureL(MCaptureInterface *, int, int, int, int)
	ChangeProperty__16CPropertyManagerUiUi @ 5 NONAME R3UNUSED ; CPropertyManager::ChangeProperty(unsigned int, unsigned int)
	Count__C17CKernelObjectList @ 6 NONAME R3UNUSED ; CKernelObjectList::Count(void) const
	DeleteCapturer__12CKeyCapturer @ 7 NONAME R3UNUSED ; CKeyCapturer::DeleteCapturer(void)
	DumpAllInfoL__17CKernelObjectListR8RClogger @ 8 NONAME R3UNUSED ; CKernelObjectList::DumpAllInfoL(RClogger &)
	DumpHeapL__10RProxyHeapR5RFile @ 9 NONAME R3UNUSED ; RProxyHeap::DumpHeapL(RFile &)
	DumpHeapToFileL__10RProxyHeapRC7TDesC16 @ 10 NONAME R3UNUSED ; RProxyHeap::DumpHeapToFileL(TDesC16 const &)
	DumpHeapToSuitableFileInDirectoryL__10RProxyHeapRt4TBuf1i256 @ 11 NONAME R3UNUSED ; RProxyHeap::DumpHeapToSuitableFileInDirectoryL(TBuf<256> &)
	GetCapturerL__12CKeyCapturer @ 12 NONAME R3UNUSED ; CKeyCapturer::GetCapturerL(void)
	GetHeapDetailsL__10RProxyHeapR12THeapDetails @ 13 NONAME R3UNUSED ; RProxyHeap::GetHeapDetailsL(THeapDetails &)
	GetHeapDetailsL__FR12THeapDetailsR10RProxyHeap @ 14 NONAME R3UNUSED ; GetHeapDetailsL(THeapDetails &, RProxyHeap &)
	GetInfoByIdL__17CKernelObjectListiiR6RBuf16T3 @ 15 NONAME ; CKernelObjectList::GetInfoByIdL(int, int, RBuf16 &, RBuf16 &)
	GetInfoByIndexL__17CKernelObjectListiiR6RBuf16T3 @ 16 NONAME ; CKernelObjectList::GetInfoByIndexL(int, int, RBuf16 &, RBuf16 &)
	GetInfoL__17CKernelObjectListiR6RBuf16T2 @ 17 NONAME ; CKernelObjectList::GetInfoL(int, RBuf16 &, RBuf16 &)
	GetQikListBoxModel__17CKernelObjectList @ 18 NONAME R3UNUSED ; CKernelObjectList::GetQikListBoxModel(void)
	GetScanCodeOfLastEvent__12CKeyCapturer @ 19 NONAME R3UNUSED ; CKeyCapturer::GetScanCodeOfLastEvent(void)
	GetValueL__16CPropertyManager @ 20 NONAME R3UNUSED ; CPropertyManager::GetValueL(void)
	GetVerboseInfoL__17CKernelObjectListiR6RBuf16T2 @ 21 NONAME ; CKernelObjectList::GetVerboseInfoL(int, RBuf16 &, RBuf16 &)
	IsCaptured__12CKeyCaptureri @ 22 NONAME R3UNUSED ; CKeyCapturer::IsCaptured(int)
	IsCaptured__12CKeyCaptureriRi @ 23 NONAME R3UNUSED ; CKeyCapturer::IsCaptured(int, int &)
	NewL__16CPropertyManagerG9TCallBack @ 24 NONAME ; CPropertyManager::NewL(TCallBack)
	NewL__17CKernelObjectListP13RMemoryAccess @ 25 NONAME R3UNUSED ; CKernelObjectList::NewL(RMemoryAccess *)
	PopCapturesL__12CKeyCapturer @ 26 NONAME R3UNUSED ; CKeyCapturer::PopCapturesL(void)
	PushCurrentCapturesL__12CKeyCapturer @ 27 NONAME R3UNUSED ; CKeyCapturer::PushCurrentCapturesL(void)
	ReadCell__10RProxyHeapPQ25RHeap5SCellT1 @ 28 NONAME R3UNUSED ABSENT ; RProxyHeap::ReadCell(RHeap::SCell *, RHeap::SCell *)
	RefreshDataL__17CKernelObjectListi @ 29 NONAME R3UNUSED ; CKernelObjectList::RefreshDataL(int)
	RemoveCapture__12CKeyCapturerP17MCaptureInterfacei @ 30 NONAME R3UNUSED ; CKeyCapturer::RemoveCapture(MCaptureInterface *, int)
	SetCurrentType__17CKernelObjectList17TKernelObjectType @ 31 NONAME R3UNUSED ; CKernelObjectList::SetCurrentType(TKernelObjectType)
	SetInfoChangedCallback__17CKernelObjectListiRC9TCallBack @ 32 NONAME R3UNUSED ; CKernelObjectList::SetInfoChangedCallback(int, TCallBack const &)
	SetPropertyFromStringL__16CPropertyManagerRC7TDesC16 @ 33 NONAME R3UNUSED ; CPropertyManager::SetPropertyFromStringL(TDesC16 const &)
	StartNotifierProxyThreadFunction__FPv @ 34 NONAME R3UNUSED ; StartNotifierProxyThreadFunction(void *)
	Walk__10RProxyHeapRiT1 @ 35 NONAME R3UNUSED ABSENT ; RProxyHeap::Walk(int &, int &)
	AddCaptureL__12CKeyCapturerP17MCaptureInterfaceii @ 36 NONAME ; CKeyCapturer::AddCaptureL(MCaptureInterface *, int, int)
	ExeNameForSid__FUiR6RBuf16 @ 37 NONAME R3UNUSED ; ExeNameForSid(unsigned int, RBuf16 &)
	ProxyWalk__10RProxyHeapPvQ25RHeap9TCellTypeT1i @ 38 NONAME ABSENT ; RProxyHeap::ProxyWalk(void *, RHeap::TCellType, void *, int)
	NotifierProxyIsRunning__Fv @ 39 NONAME R3UNUSED ; NotifierProxyIsRunning(void)
	ShutdownProxyNotifier__Fv @ 40 NONAME R3UNUSED ; ShutdownProxyNotifier(void)

