
diff -r 57c618273d5c -r bbf46f59e123 graphicscomposition/openwfcinterface/bwins/libWFCu.def
--- a/graphicscomposition/openwfcinterface/bwins/libWFCu.def	Thu Aug 19 11:11:18 2010 +0300
+++ b/graphicscomposition/openwfcinterface/bwins/libWFCu.def	Tue Aug 31 16:31:06 2010 +0300
@@ -26,7 +26,7 @@
 	wfcGetElementAttribiv @ 25 NONAME
 	wfcGetElementBelow @ 26 NONAME
 	wfcGetError @ 27 NONAME
-	wfcGetOnScreenStream @ 28 NONAME
+	extwfcGetOnScreenStream @ 28 NONAME
 	wfcGetStrings @ 29 NONAME
 	wfcInsertElement @ 30 NONAME
 	wfcIsExtensionSupported @ 31 NONAME




