
diff -r 13a436a0995b -r f5b6a43d0d2d graphicscomposition/openwfcinterface/eabi/libWFCu.def
--- a/graphicscomposition/openwfcinterface/eabi/libWFCu.def	Thu Aug 05 12:17:46 2010 +0100
+++ b/graphicscomposition/openwfcinterface/eabi/libWFCu.def	Thu Aug 05 12:20:08 2010 +0100
@@ -26,7 +26,7 @@
 	wfcGetElementAttribiv @ 25 NONAME
 	wfcGetElementBelow @ 26 NONAME
 	wfcGetError @ 27 NONAME
-	wfcGetOnScreenStream @ 28 NONAME
+	extwfcGetOnScreenStream @ 28 NONAME
 	wfcGetStrings @ 29 NONAME
 	wfcInsertElement @ 30 NONAME
 	wfcIsExtensionSupported @ 31 NONAME




