
diff -r 73ea206103e6 -r 43365a9b78a3 kernel/eka/eabi/euseru.def
--- a/kernel/eka/eabi/euseru.def	Wed Jun 23 19:44:53 2010 +0300
+++ b/kernel/eka/eabi/euseru.def	Tue Jul 06 15:50:07 2010 +0300
@@ -2538,4 +2538,8 @@
 	_ZN10RAllocator17__DbgGetAllocFailEv @ 2537 NONAME
 	_ZN4User17__DbgGetAllocFailEi @ 2538 NONAME
 	_ZN10RArrayBase12SetKeyOffsetEi @ 2539 NONAME
-
+	_ZN10RSemaphore4PollEv @ 2540 NONAME ; RSemaphore::Poll()
+	_ZN6RMutex4WaitEi @ 2541 NONAME ; RMutex::Wait(int)
+	_ZN6RMutex4PollEv @ 2542 NONAME ; RMutex::Poll()
+	_ZN9RFastLock4PollEv @ 2543 NONAME ; RFastLock::Poll()
+	_ZN9RFastLock4WaitEi @ 2544 NONAME ; RFastLock::Wait(int)




