EXPORTS
	_ZN21CLbsQualityProfileApi4NewLEv @ 1 NONAME
	_ZNK21CLbsQualityProfileApi5DoGetERKmRKyR25TTimeIntervalMicroSeconds @ 2 NONAME
	_ZNK21CLbsQualityProfileApi5DoGetERKmRKyRf @ 3 NONAME
	_ZTI21CLbsQualityProfileApi @ 4 NONAME ; #<TI>#
	_ZTV21CLbsQualityProfileApi @ 5 NONAME ; #<VT>#

