
diff -r 735348f59235 -r 948c7f65f6d4 imagingandcamerafws/imaginginttest/imagedecoder/eabi/tsi_icl_imagedecoderu.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/imagingandcamerafws/imaginginttest/imagedecoder/eabi/tsi_icl_imagedecoderu.def	Wed Sep 01 12:38:50 2010 +0100
@@ -0,0 +1,3 @@
+EXPORTS
+	_Z13NewTestSuiteLv @ 1 NONAME
+




