
diff -r 735348f59235 -r 948c7f65f6d4 mmlibs/mmfw/tsrc/mmfunittest/eabi/TS_CmmfVideoTestCustomCommandsU.DEF
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/mmlibs/mmfw/tsrc/mmfunittest/eabi/TS_CmmfVideoTestCustomCommandsU.DEF	Wed Sep 01 12:38:50 2010 +0100
@@ -0,0 +1,11 @@
+EXPORTS
+	_ZN22RMMFTestCustomCommands16MvcGetFrameRateLERf @ 1 NONAME
+	_ZN22RMMFTestCustomCommands16MvcSetFrameRateLEf @ 2 NONAME
+	_ZN22RMMFTestCustomCommandsC1ER14RMMFController4TUid @ 3 NONAME
+	_ZN22RMMFTestCustomCommandsC2ER14RMMFController4TUid @ 4 NONAME
+	_ZN27CMMFTestCustomCommandParser13HandleRequestER11TMMFMessage @ 5 NONAME
+	_ZN27CMMFTestCustomCommandParser4NewLE4TUidR32MMMFTestCustomCommandImplementor @ 6 NONAME
+	_ZN27CMMFTestCustomCommandParser5NewLCE4TUidR32MMMFTestCustomCommandImplementor @ 7 NONAME
+	_ZTI27CMMFTestCustomCommandParser @ 8 NONAME ; #<TI>#
+	_ZTV27CMMFTestCustomCommandParser @ 9 NONAME ; #<VT>#
+




