EXPORTS
	Install @ 1 NONAME R3UNUSED ; (null)
	__8TPppAddr @ 2 NONAME R3UNUSED ; TPppAddr::TPppAddr(void)
	__as__8TPppAddrRC9TSockAddr @ 3 NONAME R3UNUSED ; TPppAddr::operator=(TSockAddr const &)

