
diff -r f5d4820de50d -r 4fde310f06fe stif/StifTFwIf/Bmarm/StifTFwIfu.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/stif/StifTFwIf/Bmarm/StifTFwIfu.def	Mon Jun 14 11:37:33 2010 +0300
@@ -0,0 +1,58 @@
+EXPORTS
+	__10CUIStoreIf @ 1 NONAME R3UNUSED ; CUIStoreIf::CUIStoreIf(void)
+	AddTestCaseFile__10CStifTFwIfR7TDesC16T1 @ 2 NONAME R3UNUSED ; CStifTFwIf::AddTestCaseFile(TDesC16 &, TDesC16 &)
+	AddTestCaseFile__8CUIStoreRC7TDesC16T1 @ 3 NONAME R3UNUSED ; CUIStore::AddTestCaseFile(TDesC16 const &, TDesC16 const &)
+	AddTestModule__10CStifTFwIfR7TDesC16T1 @ 4 NONAME R3UNUSED ; CStifTFwIf::AddTestModule(TDesC16 &, TDesC16 &)
+	AddTestModule__8CUIStoreRC7TDesC16T1 @ 5 NONAME R3UNUSED ; CUIStore::AddTestModule(TDesC16 const &, TDesC16 const &)
+	AddToTestSet__8CUIStoreRC7TDesC16RC9CTestInfo @ 6 NONAME R3UNUSED ; CUIStore::AddToTestSet(TDesC16 const &, CTestInfo const &)
+	AtsReceive__10CStifTFwIfRC7TDesC16 @ 7 NONAME R3UNUSED ; CStifTFwIf::AtsReceive(TDesC16 const &)
+	CancelTestCase__10CStifTFwIfi @ 8 NONAME R3UNUSED ; CStifTFwIf::CancelTestCase(int)
+	CancelTest__18CUIEngineContainer @ 9 NONAME R3UNUSED ; CUIEngineContainer::CancelTest(void)
+	Close__10CStifTFwIf @ 10 NONAME R3UNUSED ; CStifTFwIf::Close(void)
+	Close__8CUIStore @ 11 NONAME R3UNUSED ; CUIStore::Close(void)
+	ConstructL__10CUIStoreIf @ 12 NONAME R3UNUSED ; CUIStoreIf::ConstructL(void)
+	CreateTestSet__8CUIStoreRC7TDesC16 @ 13 NONAME R3UNUSED ; CUIStore::CreateTestSet(TDesC16 const &)
+	GetTestCases__10CStifTFwIfRt13RPointerArray1Z9CTestInfoR7TDesC16T2 @ 14 NONAME ; CStifTFwIf::GetTestCases(RPointerArray<CTestInfo> &, TDesC16 &, TDesC16 &)
+	GoingToReboot__8CStifTFwP18CUIEngineContainerR14TRequestStatus @ 15 NONAME R3UNUSED ; CStifTFw::GoingToReboot(CUIEngineContainer *, TRequestStatus &)
+	InsertToTestSet__8CUIStoreRC7TDesC16RC9CTestInfoi @ 16 NONAME ; CUIStore::InsertToTestSet(TDesC16 const &, CTestInfo const &, int)
+	ListAllModules__8CUIStoreRt13RPointerArray1Z7TDesC16 @ 17 NONAME R3UNUSED ; CUIStore::ListAllModules(RPointerArray<TDesC16> &)
+	LoadAllModules__8CUIStore @ 18 NONAME R3UNUSED ; CUIStore::LoadAllModules(void)
+	LoadSavedTestCases__8CUIStore @ 19 NONAME R3UNUSED ; CUIStore::LoadSavedTestCases(void)
+	LoadTestSet__8CUIStoreRC7TDesC16 @ 20 NONAME R3UNUSED ; CUIStore::LoadTestSet(TDesC16 const &)
+	Modules__8CUIStoreRt9RRefArray1Z7TDesC16 @ 21 NONAME R3UNUSED ; CUIStore::Modules(RRefArray<TDesC16> &)
+	NewL__9CTestInfo @ 22 NONAME R3UNUSED ; CTestInfo::NewL(void)
+	Open__10CStifTFwIfR7TDesC16 @ 23 NONAME R3UNUSED ; CStifTFwIf::Open(TDesC16 &)
+	Open__8CUIStoreRC7TDesC16 @ 24 NONAME R3UNUSED ; CUIStore::Open(TDesC16 const &)
+	PauseTestCase__10CStifTFwIfi @ 25 NONAME R3UNUSED ; CStifTFwIf::PauseTestCase(int)
+	PauseTest__18CUIEngineContainer @ 26 NONAME R3UNUSED ; CUIEngineContainer::PauseTest(void)
+	PrintProg__8CStifTFwP18CUIEngineContainerR13TTestProgress @ 27 NONAME R3UNUSED ; CStifTFw::PrintProg(CUIEngineContainer *, TTestProgress &)
+	RemoteMsg__8CStifTFwP18CUIEngineContainerRC7TDesC16 @ 28 NONAME R3UNUSED ; CStifTFw::RemoteMsg(CUIEngineContainer *, TDesC16 const &)
+	RemoveFromTestSet__8CUIStoreRC7TDesC16RC9CTestInfo @ 29 NONAME R3UNUSED ; CUIStore::RemoveFromTestSet(TDesC16 const &, CTestInfo const &)
+	RemoveTestCaseFile__10CStifTFwIfR7TDesC16T1 @ 30 NONAME R3UNUSED ; CStifTFwIf::RemoveTestCaseFile(TDesC16 &, TDesC16 &)
+	RemoveTestCaseFile__8CUIStoreRC7TDesC16T1 @ 31 NONAME R3UNUSED ; CUIStore::RemoveTestCaseFile(TDesC16 const &, TDesC16 const &)
+	RemoveTestModule__10CStifTFwIfR7TDesC16 @ 32 NONAME R3UNUSED ; CStifTFwIf::RemoveTestModule(TDesC16 &)
+	RemoveTestModule__8CUIStoreRC7TDesC16 @ 33 NONAME R3UNUSED ; CUIStore::RemoveTestModule(TDesC16 const &)
+	RemoveTestSet__8CUIStoreRC7TDesC16 @ 34 NONAME R3UNUSED ; CUIStore::RemoveTestSet(TDesC16 const &)
+	ResumeTestCase__10CStifTFwIfi @ 35 NONAME R3UNUSED ; CStifTFwIf::ResumeTestCase(int)
+	ResumeTest__18CUIEngineContainer @ 36 NONAME R3UNUSED ; CUIEngineContainer::ResumeTest(void)
+	SaveTestSet__8CUIStoreRC7TDesC16 @ 37 NONAME R3UNUSED ; CUIStore::SaveTestSet(TDesC16 const &)
+	SetAttribute__10CStifTFwIf10TAttributeRC7TDesC16 @ 38 NONAME R3UNUSED ; CStifTFwIf::SetAttribute(TAttribute, TDesC16 const &)
+	StartTestCase__10CStifTFwIfRiRC9CTestInfo @ 39 NONAME R3UNUSED ; CStifTFwIf::StartTestCase(int &, CTestInfo const &)
+	StartTestCase__8CUIStoreRC9CTestInfoRi @ 40 NONAME R3UNUSED ; CUIStore::StartTestCase(CTestInfo const &, int &)
+	StartTestSet__8CUIStoreRC12CTestSetInfoRiQ215CStartedTestSet8TSetType @ 41 NONAME ; CUIStore::StartTestSet(CTestSetInfo const &, int &, CStartedTestSet::TSetType)
+	StartedTestCaseL__8CUIStorei @ 42 NONAME R3UNUSED ; CUIStore::StartedTestCaseL(int)
+	StartedTestCases__8CUIStoreRt9RRefArray1Z16CStartedTestCaseiRC7TDesC16T3 @ 43 NONAME ; CUIStore::StartedTestCases(RRefArray<CStartedTestCase> &, int, TDesC16 const &, TDesC16 const &)
+	StartedTestSetL__8CUIStorei @ 44 NONAME R3UNUSED ; CUIStore::StartedTestSetL(int)
+	StartedTestSets__8CUIStoreRt9RRefArray1Z15CStartedTestSeti @ 45 NONAME R3UNUSED ; CUIStore::StartedTestSets(RRefArray<CStartedTestSet> &, int)
+	TestCaseFiles__8CUIStoreRt9RRefArray1Z7TDesC16RC7TDesC16 @ 46 NONAME R3UNUSED ; CUIStore::TestCaseFiles(RRefArray<TDesC16> &, TDesC16 const &)
+	TestCases__8CUIStoreRt9RRefArray1Z9CTestInfoRC7TDesC16T2 @ 47 NONAME ; CUIStore::TestCases(RRefArray<CTestInfo> &, TDesC16 const &, TDesC16 const &)
+	TestExecuted__8CStifTFwP18CUIEngineContainerR15TFullTestResult @ 48 NONAME R3UNUSED ; CStifTFw::TestExecuted(CUIEngineContainer *, TFullTestResult &)
+	TestSetL__8CUIStoreRC7TDesC16 @ 49 NONAME R3UNUSED ; CUIStore::TestSetL(TDesC16 const &)
+	TestSets__8CUIStoreRt9RRefArray1Z12CTestSetInfo @ 50 NONAME R3UNUSED ; CUIStore::TestSets(RRefArray<CTestSetInfo> &)
+	UIEngineContainer__C16CStartedTestCase @ 51 NONAME R3UNUSED ; CStartedTestCase::UIEngineContainer(void) const
+	UIStore__10CUIStoreIf @ 52 NONAME R3UNUSED ; CUIStoreIf::UIStore(void)
+	"_._10CStifTFwIf" @ 53 NONAME R3UNUSED ; CStifTFwIf::~CStifTFwIf(void)
+	"_._10CUIStoreIf" @ 54 NONAME R3UNUSED ; CUIStoreIf::~CUIStoreIf(void)
+	__10CStifTFwIf @ 55 NONAME R3UNUSED ; CStifTFwIf::CStifTFwIf(void)
+	AbortTestSet__8CUIStoreR15CStartedTestSet @ 56 NONAME R3UNUSED ; CUIStore::AbortTestSet(CStartedTestSet &)
+




