
diff -r f5d4820de50d -r 4fde310f06fe stif/TestServer/BMARM/STIFTESTSERVERU.DEF
--- a/stif/TestServer/BMARM/STIFTESTSERVERU.DEF	Tue May 25 18:01:01 2010 +0300
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,25 +0,0 @@
-EXPORTS
-	__11RTestServer @ 1 NONAME R3UNUSED ; RTestServer::RTestServer(void)
-	CancelAsyncRequest__14RTestExecutioni @ 2 NONAME R3UNUSED ; RTestExecution::CancelAsyncRequest(int)
-	Close__11RTestModule @ 3 NONAME R3UNUSED ; RTestModule::Close(void)
-	Close__11RTestServer @ 4 NONAME R3UNUSED ; RTestServer::Close(void)
-	Close__14RTestExecution @ 5 NONAME R3UNUSED ; RTestExecution::Close(void)
-	Connect__11RTestServerRCt4TBuf1i256RC7TDesC16 @ 6 NONAME R3UNUSED ; RTestServer::Connect(TBuf<256> const &, TDesC16 const &)
-	EnumerateTestCases__11RTestModuleR7TDesC16Rt8TPckgBuf1ZiR14TRequestStatus @ 7 NONAME ; RTestModule::EnumerateTestCases(TDesC16 &, TPckgBuf<int> &, TRequestStatus &)
-	ErrorNotification__11RTestModuleRt5TPckg1Z18TErrorNotificationR14TRequestStatus @ 8 NONAME R3UNUSED ; RTestModule::ErrorNotification(TPckg<TErrorNotification> &, TRequestStatus &)
-	GetTestCases__11RTestModuleRt15CFixedFlatArray1Z13TTestCaseInfo @ 9 NONAME R3UNUSED ; RTestModule::GetTestCases(CFixedFlatArray<TTestCaseInfo> &)
-	NotifyEvent__14RTestExecutionRt5TPckg1Z8TEventIfR14TRequestStatusi @ 10 NONAME ; RTestExecution::NotifyEvent(TPckg<TEventIf> &, TRequestStatus &, int)
-	NotifyProgress__14RTestExecutionRt5TPckg1Z13TTestProgressR14TRequestStatus @ 11 NONAME R3UNUSED ; RTestExecution::NotifyProgress(TPckg<TTestProgress> &, TRequestStatus &)
-	NotifyRemoteCmd__14RTestExecutionRt5TPckg1Z12TStifCommandRt5TPckg1ZiR14TRequestStatus @ 12 NONAME ; RTestExecution::NotifyRemoteCmd(TPckg<TStifCommand> &, TPckg<int> &, TRequestStatus &)
-	Open__11RTestModuleR11RTestServerRt4TBuf1i256 @ 13 NONAME R3UNUSED ; RTestModule::Open(RTestServer &, TBuf<256> &)
-	Open__14RTestExecutionR11RTestServeriRCt4TBuf1i256 @ 14 NONAME ; RTestExecution::Open(RTestServer &, int, TBuf<256> const &)
-	Pause__14RTestExecution @ 15 NONAME R3UNUSED ; RTestExecution::Pause(void)
-	ReadRemoteCmdInfo__14RTestExecutionR5TDes812TStifCommandi @ 16 NONAME ; RTestExecution::ReadRemoteCmdInfo(TDes8 &, TStifCommand, int)
-	Resume__14RTestExecution @ 17 NONAME R3UNUSED ; RTestExecution::Resume(void)
-	RunTestCase__14RTestExecutionRt5TPckg1Z15TFullTestResultR14TRequestStatus @ 18 NONAME R3UNUSED ; RTestExecution::RunTestCase(TPckg<TFullTestResult> &, TRequestStatus &)
-	StartNewServer__FRCt4TBuf1i256Rt4TBuf1i256 @ 19 NONAME R3UNUSED ; StartNewServer(TBuf<256> const &, TBuf<256> &)
-	StartNewServer__FRCt4TBuf1i256Rt4TBuf1i256iG10RSemaphore @ 20 NONAME ; StartNewServer(TBuf<256> const &, TBuf<256> &, int, RSemaphore)
-	Version__C11RTestServer @ 21 NONAME R3UNUSED ; RTestServer::Version(void) const
-	CancelAsyncRequest__11RTestModulei @ 22 NONAME R3UNUSED ; RTestModule::CancelAsyncRequest(int)
-	GetServerThreadId__11RTestServerR9TThreadId @ 23 NONAME R3UNUSED ; RTestServer::GetServerThreadId(TThreadId &)
-




